
    SHUTDOWN/REBOOT

    You can use this program to either shutdown or reboot all hosts in
    the current pool. When you use this option, the following window
    appears:

    This window has the following fields:

    Hostnames

    Use this field if you want to perform the shutdown/reboot operation
    only on a subset of the currently managed hosts. You can also click
    on the arrow button to the right to bring up a pick list of all
    currently managed hosts and make your selections from there. Leave a
    blank space between each host name if you are specifying multiple
    entries.

    If you leave this field blank, all hosts in the current pool will be
    shutdown/reboot.

    Delay Time

    You can use this field to specify a delay before the shutdown/reboot
    occurs. The delay time should give users enough time to prepare for
    the system shutdown/reboot.The default is 60 seconds.

    This field will accept both relative and absolute time formats. See
    "TIME FORMATS" on page C-1 for more details.

    Countdown

    Use this toggle to choose whether a countdown should occur prior to
    starting the shutdown or reboot. A countdown will display warning
    messages at regular intervals to the terminals of all hosts being
    taken down or rebooted. The default is Yes.

    Banner mode

    Use this toggle to choose whether the (user-definable) broadcast
    message should be displayed in extremely large text. This message
    should be relatively brief. The default is Yes.

    Reconfigure

    Use this toggle to choose whether the hosts should be reconfigured
    when they are rebooted. The default is Yes.

    Shutdown Options

    Use this toggle to choose whether the hosts should be put in an
    initialized state of a single-user mode when they are shutdown. The
    default is Off. This choice only matters if you then use the
    Shutdown button.

    Note: Some systems, like Solaris 2.x will cut power to the CPU
    during a shutdown.

    Broadcast Message

    You can use this text field to type in the message to be broadcast
    to all hosts prior to shutdown. Otherwise, the default message
    "System Going Down in n Minutes" will be used.

    Buttons

    This window has the following buttons:

    Shutdown

    Click on this button to selectively begin to shutdown the host
    specified in the Hostnames field. If you leave he Hostnames field
    blank, all hosts in the current pool will be shutdown.

    Reboot

    Click on this button to selectively begin to reboot the host
    specified in the Hostnames field. If you leave he Hostnames field
    blank, all hosts in the current pool will be shutdown.

    Status

    Click on this button to display the status of all pending shutdowns
    and/or reboots. The following window will appear:


    Abort

    Click on this button to abort all pending shutdowns and/or reboots
    immediately. You will be prompted for confirmation of this action.
    Enlighten will then abort all pending shutdowns and/or reboots on
    hosts in the current pool.

    Cancel

    Click on this button to close the window without making any changes.
